Turkish wildfire kills 10 firefighters, rescue workers amid extreme heat | Wildlife News

At least 10 firefighters and rescue workers were killed and 14 injured in Turkiye’s Eskisehir province while battling wildfires exacerbated by high temperatures and strong winds. Turkish officials reported that 24 firefighters became trapped and were engulfed by flames, with President Erdogan expressing condolences for the victims who died protecting the forests. Want More Context? […]

The post Turkish wildfire kills 10 firefighters, rescue workers amid extreme heat | Wildlife News appeared first on NewsWave.