British tourist, 38, dies after Turkey hair transplant goes wrong

A British man, 38, died shortly after undergoing a hair transplant at the CINIK clinic in Istanbul, Turkey. Following the five-hour procedure, he fell ill and was admitted to intensive care, where he later passed away, prompting an investigation into potential “reckless homicide” as Turkey remains a popular destination for cosmetic surgeries. Want More Context? […]

The post British tourist, 38, dies after Turkey hair transplant goes wrong appeared first on NewsWave.