Map reveals where wildfires are spreading in Turkey and parts of Europe

Wildfires are devastating Turkey, Greece, and Bulgaria amid extreme heat, evacuating tens of thousands and resulting in over a dozen deaths, including firefighters. Turkey’s highest temperature reached 50.5°C, while Greece faced multiple major fires, particularly in Athens and Kythera, and Bulgaria’s emergency services deemed the situation critical with nearly 100 active fire locations.

Want More Context?

The post Map reveals where wildfires are spreading in Turkey and parts of Europe appeared first on NewsWave.