3 observations after Paul George exits with left knee injury in Sixers’ preseason win

Paul George exited the Sixers’ preseason game with a left knee hyperextension, while the team secured a 104-89 win over the Hawks. Tyrese Maxey had 14 points and seven assists, and Joel Embiid is not expected to play this preseason due to a knee injury. Eric Gordon started alongside Maxey, and George led the second unit before leaving the game early with his injury.

Full Article

The post 3 observations after Paul George exits with left knee injury in Sixers’ preseason win appeared first on News Wave.