Biden blames jet lag for debate debacle: ‘I almost fell asleep on stage’

During a recent debate, President Biden blamed jet lag for his lackluster performance, admitting that he “almost fell asleep on stage.” Critics have questioned his ability to lead the country if he can’t handle the demands of a debate. Some have called for more transparency regarding his health and stamina.

Source link

The post Biden blames jet lag for debate debacle: ‘I almost fell asleep on stage’ appeared first on News Wave.