Better weather, better Nelly: Korda shoots up board at ShopRite LPGA Classic with a 66

Nelly Korda had an even-par 71 in the first round of the ShopRite LPGA Classic, marked by four birdies and four bogeys, but improved significantly to a 66 in the second round, aided by calmer weather conditions that allowed for a more aggressive play. After two rounds, she stands at 5 under, six strokes behind leader Ilhee Lee, and expressed her enjoyment of the event’s crowd, noting the positive trend in fan support, especially among young aspiring golfers. Korda appreciates the opportunity to inspire the next generation through her participation in the tournament.

Full Article

The post Better weather, better Nelly: Korda shoots up board at ShopRite LPGA Classic with a 66 appeared first on News Wave.